Copyright: Spying King 2.0 by Spying Gudi, Thanks to Spying Chanty for her help with my English.
Citation: Spying King 2.0 by Spying Gudi, Thanks to Spying Chanty for her help with my English.


Main
Spying King 2.0

by

Spying Gudi

Never Run any files under “Files to Send” on your own computer

I) Description

II) Installation/Configuration

III) Connecting to Remote Computer

IV) Utilisation

 Thanks to Spying Chanty for her help with my English

If you need some help E-Mail me at:

spyinggudi@yahoo.com


Description
Spying King 2.0

by

Spying Gudi

Never Run any files under “Files to Send” on your own computer

Description

Spying King is a Network Remote Control Tool, which means that Spying King allows you to control other Computers via a Network Connection.

Spying King is divided into two main applications, the server and the client.

The server is the application that is installed on the Remote Computer.

The client is the application that stays on your computer (SpyingKing.exe).


Installation
Spying King 2.0

by

Spying Gudi

Never Run any files under “Files to Send” on your own computer

Installation/Configuration

Once you have unzipped the downloaded file there will be five files:

-Config.exe

-Files.sys

-ReadMe.hlp

-SpyingKing.exe

-TestConnection.exe

and one subfolder:

-Files to Send

Never Rename any of these Files or Folders

Spying King can manage as many Remote Computers as you will ever need.

Ok, now let's setup Spying King for a Remote Computer !

The first thing to know is, whether the Remote Computer has a Dynamic IP or a Static IP

If you are not sure about it, then you should assume that the Remote Computer has a Dynamic IP.

First Case: the Remote Computer has a Static IP

Second Case: the Remote Computer has a Dynamic IP


IP
Dynamic IP/Static IP

When most people connect to the internet

their provider gives them a new Network Address

(called IP), unless the Remote Computer is a

server or has a cable connection, chances are that

it will have a Dynamic IP.


Configuring a Static Ip Connection
Spying King 2.0

by

Spying Gudi

Never Run any files under “Files to Send” on your own computer

First Case: the Remote Computer has a Static IP

Run Config.exe.

  Now you must give a Name to the Remote Computer.

Let's call it "John Smith".

Type "John Smith" and then click "OK"

  Let's say that the IP of the Remote Computer is 255.255.255.255.

Just type the IP in the Proper Field.

Now you must decide thru which port the client and the server are going to Communicate.

You can choose whichever Port you want but you must avoid the ports 21, 80, 110, 8080, 25 and any other port commonly used by other software.

You can now click "OK".

Now there is a warning telling you that it might take up to 20 minutes, click "OK".

 Never close config.exe with Ctrl+Alt+Del, while it's configuring

Once it's done, you will have a message, since you configured a Static IP connection you don't need to run TestConnection.exe, click "OK".

Now go back to the folder where you unzipped Spying King. Open the Subfolder called "Files to Send". There should be a new subfolder called "File for John Smith". Open this new folder and you should see a file called "RenameMe.exe". You should rename this file to whatever you want (the extension has to remain .exe). Now you should send the file you just renamed to the Remote Computer. Once the owner of the Remote Computer double-clicks on the file, it's going to install itself automatically.

Never Run the RenameMe.exe file on your own Computer


Configuring a Dynamic Ip Connection
Spying King 2.0

by

Spying Gudi

Never Run any files under “Files to Send” on your own computer

Second Case: the Remote Computer has a Dynamic IP

First you need to setup an FTP account.

My advice would be to setup an account at Geocities (www.geocities.com) which will give you access to your own FTP site to manage your Files.

Once you received an E-Mail from Geocities with the proper information (username, password) you can run Config.exe.

You cannot use the same FTP Site information (Ftp Site, username, password) for two different connections !!!!

  Now you must give a Name to the Remote Computer.

Let's call it "Jean Dupont".

Type "Jean Dupont" and then click "OK".

  Ftp Site: ftp.geocities.com (never use the tag http:// or ftp://)

Username: Your Geocities UserName

Password: Your Geocities Password

Port: 21

Now you must decide which port the client and the server are going to Communicate.

You can choose whatever Port you want but you must avoid the ports 21, 80, 110, 8080, 25 and any other port commonly used by other softwares.

You can now click "OK".

Now there is a warning telling you that it might take up to 20 minutes, click "OK".

 Never close config.exe with Ctrl+Alt+Del, while it's configuring

Once it's done you will have a message, click "OK".

Before sending the configured file to the Remote Computer you should run TestConnection.exe, to make sure that everything works fine.

Run TestConnection.exe.

  Select the connection you just configured (Jean Dupont in our example).

Click "Test Connection".

  Please wait while TestConnection is testing your FTP connection. If everything goes fine, you should receive two messages telling you that the two tests passed successfully. If ever you get an error message, you should try again. If the connection cannot be tested successfully after a few times, then it means there is a problem either with the information you entered in Config.exe or there might be a problem with the FTP site itself. In this case you should find another FTP site. In any case, do not send the RenameMe.exe file unless the FTP connection Test was passed successfully.

If the test could not be passed successfully you should run SpyingKing.exe and Remove the Remote Computer you just configured (Jean Dupont in our example).

If the test was passed successfully you should go back to the folder where you unzipped Spying King, open the Subfolder called "Files to Send", there should be a new subfolder called "File for Jean Dupont", open this new folder and you should see as file called "RenameMe.exe". You should rename this file to whatever you want (the extension has to remain .exe). Now you should send the file you just renamed to the Remote Computer, once the owner of the Remote Computer will double-click on the file, it's going to install itself.

Never Run the RenameMe.exe file on your own Computer


Ftp
Setup an FTP account

When you connect to the internet your Network address

changes (Dynamic IP).  Now the problem is how are the client

and the server going to find each other if they are both always

moving out ?

To do this, they need something that never moves and that is

Going to be the link between each other, and that link is going

To be the FTP site, every time the Remote Computer is going to

connect to the internet, Spying King Server is going to connect

to the FTP site and will sent its new IP as a file.

When you run SpyingKing.exe, it is going to connect to the

same FTP site and will get the client's IP, and once Spying

King Client (you) got the new IP of the Remote Computer it

will connect to the Remote Computer.


Connecting to Remote Computer
Spying King 2.0

by

Spying Gudi

Never Run any files under “Files to Send” on your own computer

Connecting to Remote Computer

Run SpyingKing.exe.

If you want to configure a new Remote Computer then click "Add New" (it's the same as if you ran Config.exe).

If you want to remove a Remote Computer then click "Remove".

Once you selected the Remote Computer you want to connect to, click "Connect".

First Case: the Remote Computer has a Static IP

Second Case: the Remote Computer has a Dynamic IP


Connecting to a Static Ip Connection
Spying King 2.0

by

Spying Gudi

Never Run any files under “Files to Send” on your own computer

First Case: the Remote Computer has a Static IP

Once you selected your IP Static Connection Type, the following window should come up.

  In the Input Field there is the IP you entered in Config.exe (255.255.255.255 for John Smith).

If you know that the Static IP of the Remote Computer changed then you can type its new IP here.

Click "OK".


Connecting to a Dynamic Ip Connection
Spying King 2.0

by

Spying Gudi

Never Run any files under “Files to Send” on your own computer

Second Case: the Remote Computer has a Dynamic IP

Once you selected your IP Static Connection Type, the following window should come up.

  This window means Spying King is connecting to the FTP Site (the one you entered in Config.exe) to download the file containing the IP of the Remote Computer.

If there is any error while connecting to the FTP Site (too many people connecting in the same time...etc) this window will come up.

  In  the case where you may have a clue about what is the IP of the Remote Computer, but in most case you will not know it. Anyway, if you know it then you should type it and click "OK", otherwise click "Cancel" and try to connect later.


Utilisation
Spying King 2.0

by

Spying Gudi

Never Run any files under “Files to Send” on your own computer

Utilisation

Spying King interface is divided into four areas:

1) The files Explorer/Manager

You can easily browse thru the files of the Remote Computer as you would with your own computer.

When you right-click on a file you will see this menu:

  Open, Download, Cut, Copy and Paste do the same thing than the buttons.

Properties will open a new window containing all the properties of the selected file:

  If the selected file is an application, it will run it. If the selected file is a non-executable file it will run the associated application (Notepad for .txt files).

  It will delete a whole folder or the selected file.

  It will create a new folder:

  You can set the attributes of the new folder.

  It will upload a file to the Remote Computer.

  It will download the selected file.

  It will copy the selected file.

  It will cut the selected file.

  It will paste the cut/copied file.

  It will change the attributes of the selected file or of the selected folder.

2) The Tools

  After being done with the Tasks List, it will bring back the Files Explorer.

  It will open a window over top of the Files Explorer, and it will list all the running Tasks on the Remote Computer.

  It will capture the Screen of the Remote Computer, save it to a file, and then automatically send it to you.

  This is the Chat Tool. It opens a window on the Remote Computer, the window looks pretty much like this one but it cannot be closed and it always stays on top.

  Crazy CD Tray

  Allows you to print files or text on the Printer of the Remote Computer:

 If the selected file is .bmp or .jpg or .gif or .wmf Spying King Server will actually print the picture, otherwise the file will be printed in binary mode.

  Find a file on the Remote Computer.

  Change the display settings on the Remote Computer.

  These are the special features of Spying King 2.0.

Open Windows Explorer Window: It will open a Windows Explorer window on the Remote Computer (as it would do when you double click on My Computer, c:\ pretty useful want you want to show some files)

Get Clipboard text:  It will open this window

 with the text of the clipboard of the Remote        Computer

Get Cached Password: It will retreive the DUN Username and Password

  When there is an updated version of Spying King, you can download the file "update.exe" and then send it to the Remote Computer. Once the Remote Computer has received the file it will take care of the update by itself.

  To change the settings (IP Static, IP Dynamic, Ftp site, etc).

Never disconnect from the internet or close Spying King, until you receive the message saying that the Remote Computer has successfully updated it's Configuration

  About Spying King 2.0

3) The Information

4) The Error Logging

Every time an error occurs on the Remote Computer, it sends you an error message.